-- HJ 212-2017 �ֳ��豸���м�����ݱ�
CREATE TABLE IF NOT EXISTS `hj212_monitor_data` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '����',
  `qn` varchar(20) DEFAULT NULL COMMENT '�������',
  `st` varchar(5) DEFAULT NULL COMMENT 'ϵͳ����',
  `cn` varchar(7) DEFAULT NULL COMMENT '�������',
  `mn` varchar(27) DEFAULT NULL COMMENT '�豸Ψһ��ʶ',
  `pw` varchar(9) DEFAULT NULL COMMENT '��������',
  `flag` int(11) DEFAULT NULL COMMENT '��־λ',
  `pnum` varchar(9) DEFAULT NULL COMMENT '�ܰ���',
  `pno` varchar(8) DEFAULT NULL COMMENT '����',
  `data_time` datetime DEFAULT NULL COMMENT '����ʱ��(DataTime)',
  `item_key` varchar(64) DEFAULT NULL COMMENT '��������',
  `item_value` varchar(500) DEFAULT NULL COMMENT '�����ֵ',
  `cp_content` text COMMENT 'ָ�����ԭʼ����',
  `raw_packet` text COMMENT 'ԭʼ����',
  `client_ip` varchar(64) DEFAULT NULL COMMENT '�ͻ���IP',
  `receive_time` datetime DEFAULT NULL COMMENT '����ʱ��',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '����ʱ��',
  PRIMARY KEY (`id`),
  KEY `idx_mn_receive_time` (`mn`, `receive_time`),
  KEY `idx_cn_data_time` (`cn`, `data_time`),
  KEY `idx_qn` (`qn`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='HJ212�ֳ��豸���м������';
