-- 畜牧监控点位
-- 业务说明见 doc/视频监控系统/对接畜牧监控/畜牧监控技术方案.md（v1.2）

CREATE TABLE IF NOT EXISTS `biz_livestock_monitor` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `monitor_id` varchar(32) NOT NULL COMMENT '摄像头ID',
  `monitor_name` varchar(32) NOT NULL COMMENT '监控名称',
  `owner_type` tinyint(4) DEFAULT NULL COMMENT '1养殖主体 2交易市场',
  `owner_id` bigint(20) DEFAULT NULL COMMENT '主体ID',
  `owner_name` varchar(64) DEFAULT NULL COMMENT '主体名称',
  `enclosure_name` varchar(64) DEFAULT NULL COMMENT '圈舍',
  `install_location` varchar(32) DEFAULT NULL COMMENT '安装位置',
  `video_source` varchar(32) NOT NULL COMMENT '视频来源：wvp/ys7/url',
  `video_url` varchar(512) DEFAULT NULL COMMENT '视频播放地址',
  `del_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0存在 2删除',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`),
  KEY `idx_monitor_name` (`monitor_name`),
  KEY `idx_monitor_id` (`monitor_id`),
  KEY `idx_owner` (`owner_type`, `owner_id`),
  KEY `idx_create_time` (`create_time`),
  KEY `idx_del_flag` (`del_flag`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='畜牧监控点位';

