-- 实验室检测
CREATE TABLE IF NOT EXISTS `biz_lab_detection` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `test_date` date NOT NULL COMMENT '检测日期',
  `quarantine_station_id` bigint(20) NOT NULL COMMENT '检疫点ID(检疫站)',
  `sample_source` tinyint(2) NOT NULL COMMENT '样本来源1场地2疫情送检3调运4日常',
  `test_quantity` int(11) NOT NULL DEFAULT '0' COMMENT '检测量份',
  `positive_count` int(11) NOT NULL DEFAULT '0' COMMENT '阳性检出数份',
  `detection_rate` decimal(8,4) NOT NULL DEFAULT '0.0000' COMMENT '检出率比值',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`),
  KEY `idx_test_date` (`test_date`),
  KEY `idx_sample_source` (`sample_source`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='实验室检测';
