-- 牦牛疾病预警：第三方健康源数据（检疫/诊疗/养殖过程），同步后本地分析生成预警
CREATE TABLE IF NOT EXISTS `biz_yak_health_source_record` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `external_id` varchar(64) NOT NULL COMMENT '第三方记录ID（类型前缀+主键）',
  `record_type` tinyint(4) NOT NULL COMMENT '1检疫 2诊疗 3养殖过程',
  `record_time` datetime NOT NULL COMMENT '业务时间（检疫/诊疗/记录时间）',
  `region_key` varchar(128) DEFAULT NULL COMMENT '地区键（县+乡镇或牧场，用于集中判断）',
  `farm_id` bigint(20) DEFAULT NULL COMMENT '第三方农场ID',
  `farm_name` varchar(128) DEFAULT NULL COMMENT '农场/牧场名称',
  `yak_no` varchar(64) DEFAULT NULL COMMENT '牦牛编号（耳标/场内编号）',
  `result_code` varchar(64) DEFAULT NULL COMMENT '结果码或病种摘要',
  `result_text` varchar(512) DEFAULT NULL COMMENT '结果/诊断/过程描述',
  `analyzed_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0未分析 1已分析',
  `last_sync_time` datetime DEFAULT NULL COMMENT '最近同步时间',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_external_id` (`external_id`),
  KEY `idx_record_type_analyzed` (`record_type`, `analyzed_flag`),
  KEY `idx_region_time` (`region_key`, `record_time`),
  KEY `idx_record_time` (`record_time`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='牦牛健康源数据（第三方同步）';
