-- 检疫站管理
-- 业务说明见 doc/畜牧流通资源管理/检疫站管理/检疫站管理技术方案.md

CREATE TABLE IF NOT EXISTS `biz_quarantine_station` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `station_name` varchar(32) NOT NULL COMMENT '检疫站名称',
  `detail_address` varchar(200) NOT NULL COMMENT '详细地址',
  `person_in_charge` varchar(32) NOT NULL COMMENT '负责人',
  `contact_phone` varchar(20) NOT NULL COMMENT '联系方式',
  `operate_status` tinyint(4) NOT NULL DEFAULT '1' COMMENT '1正常2停业3注销',
  `photo_file_url` varchar(512) DEFAULT NULL COMMENT '照片URL',
  `photo_file_path` varchar(512) DEFAULT NULL COMMENT '照片存储路径',
  `del_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0存在2删除',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  PRIMARY KEY (`id`),
  KEY `idx_station_name` (`station_name`),
  KEY `idx_operate_status` (`operate_status`),
  KEY `idx_create_time` (`create_time`),
  KEY `idx_del_flag` (`del_flag`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='检疫站';
