-- 养殖圈舍（第三方 OpenFarmEnclosureVo 同步）
CREATE TABLE IF NOT EXISTS `biz_farm_enclosure` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '本地主键',
  `external_id` bigint(20) NOT NULL COMMENT '第三方编号 OpenFarmEnclosureVo.id',
  `pasture_id` bigint(20) DEFAULT NULL COMMENT '本地养殖场 biz_pasture.id',
  `farm_external_id` bigint(20) DEFAULT NULL COMMENT '第三方养殖场ID farmId',
  `farm_name` varchar(128) DEFAULT NULL COMMENT '养殖场名称',
  `enclosure_name` varchar(128) NOT NULL COMMENT '圈舍名称',
  `enclosure_no` varchar(64) DEFAULT NULL COMMENT '圈舍码',
  `qr_code` varchar(128) DEFAULT NULL COMMENT '圈舍二维码',
  `supervisor` varchar(64) DEFAULT NULL COMMENT '负责人',
  `introduction` text DEFAULT NULL COMMENT '圈舍介绍',
  `enclosure_status` char(1) DEFAULT NULL COMMENT '0使用中 1空闲 2维护中',
  `area_type` varchar(32) DEFAULT NULL COMMENT '区域类型',
  `cattle_quantity` bigint(20) DEFAULT NULL COMMENT '牛只数量',
  `external_create_time` datetime DEFAULT NULL COMMENT '第三方 createTime',
  `data_source` varchar(32) DEFAULT NULL COMMENT '数据来源 third_party',
  `last_sync_time` datetime DEFAULT NULL COMMENT '最近同步时间',
  `del_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0正常 2删除',
  `create_by` varchar(64) DEFAULT '',
  `create_time` datetime DEFAULT NULL,
  `update_by` varchar(64) DEFAULT '',
  `update_time` datetime DEFAULT NULL,
  `remark` varchar(500) DEFAULT NULL,
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_external_id` (`external_id`),
  KEY `idx_pasture_id` (`pasture_id`),
  KEY `idx_farm_external_id` (`farm_external_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='养殖圈舍（第三方同步）';
