-- 环境监测数据（第三方 OpenEnvMonitoringVo 同步）
CREATE TABLE IF NOT EXISTS `biz_env_monitoring_record` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '本地主键',
  `external_id` bigint(20) NOT NULL COMMENT '第三方监测记录ID',
  `pasture_id` bigint(20) DEFAULT NULL COMMENT '本地养殖场ID',
  `farm_external_id` bigint(20) DEFAULT NULL COMMENT '第三方养殖场ID',
  `farm_name` varchar(128) DEFAULT NULL COMMENT '养殖场名称',
  `enclosure_id` bigint(20) DEFAULT NULL COMMENT '本地圈舍ID',
  `enclosure_external_id` bigint(20) DEFAULT NULL COMMENT '第三方圈舍ID',
  `enclosure_name` varchar(128) DEFAULT NULL COMMENT '圈舍名称',
  `temperature` decimal(8,2) DEFAULT NULL COMMENT '温度',
  `humidity` decimal(8,2) DEFAULT NULL COMMENT '湿度',
  `ammonia` decimal(8,2) DEFAULT NULL COMMENT '氨气',
  `h2s` decimal(8,2) DEFAULT NULL COMMENT '硫化氢',
  `monitoring_time` datetime DEFAULT NULL COMMENT '监测时间',
  `data_source` varchar(32) DEFAULT NULL COMMENT '数据来源 third_party',
  `last_sync_time` datetime DEFAULT NULL COMMENT '最近同步时间',
  `del_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0正常 2删除',
  `create_by` varchar(64) DEFAULT '',
  `create_time` datetime DEFAULT NULL,
  `update_by` varchar(64) DEFAULT '',
  `update_time` datetime DEFAULT NULL,
  `remark` varchar(500) DEFAULT NULL,
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_external_id` (`external_id`),
  KEY `idx_pasture_id` (`pasture_id`),
  KEY `idx_enclosure_id` (`enclosure_id`),
  KEY `idx_monitoring_time` (`monitoring_time`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='环境监测数据（第三方同步）';
