-- 休药期标准主表（与 doc/休药期标准/休药期标准管理技术方案.md 一致；无 publish 字段）
CREATE TABLE IF NOT EXISTS `biz_withdrawal_period_standard` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `drug_name` varchar(64) NOT NULL COMMENT '药物名称（1～20字）',
  `drug_type` tinyint(4) NOT NULL COMMENT '1抗生素2抗原虫3抗病毒4激素',
  `withdrawal_days` int(11) NOT NULL COMMENT '休药期天数1～999',
  `usage_guide` varchar(600) NOT NULL COMMENT '使用指南',
  `drug_effect` varchar(600) NOT NULL COMMENT '药物作用',
  `kb_sync_status` tinyint(4) NOT NULL DEFAULT '0' COMMENT '0未同步1已同步',
  `kb_doc_id` varchar(128) DEFAULT NULL COMMENT '知识库文档ID',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_drug_name` (`drug_name`),
  KEY `idx_create_time` (`create_time`),
  KEY `idx_drug_type` (`drug_type`),
  KEY `idx_kb` (`kb_sync_status`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='休药期标准';

-- 权限标识建议：withdrawalPeriod:standard:list | query | add | edit | remove | syncKb | removeKb
