-- 隔离巡查登记
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `biz_isolation_patrol` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '主键',
  `patrol_time` datetime NOT NULL COMMENT '巡查时间',
  `pen_id` bigint(20) NOT NULL COMMENT '圈位ID',
  `pen_code` char(2) NOT NULL COMMENT '圈位编号',
  `sick_dead_qty` int(11) NOT NULL DEFAULT '0' COMMENT '病死病害数量头',
  `content_desc` varchar(200) NOT NULL COMMENT '巡查内容描述',
  `handle_desc` varchar(200) NOT NULL COMMENT '处理情况',
  `ear_tags` text COMMENT '耳标逗号分隔',
  `photo_url` varchar(512) DEFAULT NULL COMMENT '巡查照片URL',
  `photo_path` varchar(512) DEFAULT NULL COMMENT '巡查照片路径',
  `del_flag` char(1) NOT NULL DEFAULT '0' COMMENT '0存在 2删除',
  `create_by` varchar(64) DEFAULT '' COMMENT '创建者',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) DEFAULT '' COMMENT '更新者',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`id`),
  KEY `idx_patrol_time` (`patrol_time`),
  KEY `idx_pen_id` (`pen_id`),
  KEY `idx_pen_code` (`pen_code`),
  KEY `idx_del_flag` (`del_flag`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='隔离巡查登记';
